0 1 2 3 4 5 6 7 8 9 10 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9 The history of the height of the fluidized bed

time (sec.)

Fluidized bed Height (H-H 0)/H0

U=0.0

U=0.25

U=0.3

U=0.4

U=0.5

U=1.0

U=1.5 U=2